\documentclass{manual}

% NOTE: this file controls which chapters/sections of the library
% manual are actually printed.  It is easy to customize your manual
% by commenting out sections that you're not interested in.

\title{Python Library Reference for the Improved Python Debugger}

\input{boilerplate}

\makeindex                      % tell \index to actually write the
                                % .idx file
\makemodindex                   % ... and the module index as well.

 
\begin{document}

\maketitle

\ifhtml
\chapter*{Front Matter\label{front}}
\fi

\input{copyright}

\begin{abstract}

\noindent
Python is an extensible, interpreted, object-oriented programming
language.  It supports a wide range of applications, from simple text
processing scripts to interactive Web browsers.

We describe here only the Improved Python Debugger. The rest of the The
\ulink{\module{Python Reference Manual}}
{http://docs.python.org/lib/lib.html} should be consulted for other
standard Python modules including the original \ulink{\module{Python
Debugger}}{http://docs.python.org/lib/module-pdb.html} (\tt{pdb.py}).

\end{abstract}

\tableofcontents

                                % Chapter title:

% =============
% DEVELOPMENT TOOLS
% =============
%                                % Software development support

\renewcommand{\baselinestretch}{3.0}\normalsize
\input{libmpdb}                  % The Python Debugger


\end{document}
