\chapter{The Python Debugger}
\stmodindex{pdb}
\index{debugging}

\renewcommand{\indexsubitem}{(in module pdb)}

The module \code{pdb} defines an interactive source code debugger for
Python programs.  It supports setting breakpoints and single stepping
at the source line level, inspection of stack frames, source code
listing, and evaluation of arbitrary Python code in the context of any
stack frame.  It also supports post-mortem debugging and can be called
under program control.

The debugger is extensible --- it is actually defined as a class
\code{Pdb}.  The extension interface uses the (also undocumented)
modules \code{bdb} and \code{cmd}; it is currently undocumented but
easily understood by reading the source.
\ttindex{Pdb}
\ttindex{bdb}
\ttindex{cmd}

A primitive windowing version of the debugger also exists --- this is
module \code{wdb}, which requires STDWIN (see the chapter on STDWIN
specific modules).
\index{stdwin}
\ttindex{wdb}

Typical usage to run a program under control of the debugger is:

\begin{verbatim}
>>> import pdb
>>> import mymodule
>>> pdb.run('mymodule.test()')
(Pdb)
\end{verbatim}

Typical usage to inspect a crashed program is:

\begin{verbatim}
>>> import pdb
>>> import mymodule
>>> mymodule.test()
(crashes with a stack trace)
>>> pdb.pm()
(Pdb)
\end{verbatim}

The debugger's prompt is ``\code{(Pdb) }''.

The module defines the following functions; each enters the debugger
in a slightly different way:

\begin{funcdesc}{run}{statement\optional{\, globals\optional{\, locals}}}
Execute the \var{statement} (given as a string) under debugger
control.  The debugger prompt appears before any code is executed; you
can set breakpoints and type \code{continue}, or you can step through
the statement using \code{step} or \code{next} (all these commands are
explained below).  The optional \var{globals} and \var{locals}
arguments specify the environment in which the code is executed; by
default the dictionary of the module \code{__main__} is used.  (See
the explanation of the \code{exec} statement or the \code{eval()}
built-in function.)
\end{funcdesc}

\begin{funcdesc}{runeval}{expression\optional{\, globals\optional{\, locals}}}
Evaluate the \var{expression} (given as a a string) under debugger
control.  When \code{runeval()} returns, it returns the value of the
expression.  Otherwise this function is similar to
\code{run()}.
\end{funcdesc}

\begin{funcdesc}{runcall}{function\optional{\, argument\, ...}}
Call the \var{function} (a function or method object, not a string)
with the given arguments.  When \code{runcall()} returns, it returns
whatever the function call returned.  The debugger prompt appears as
soon as the function is entered.
\end{funcdesc}

\begin{funcdesc}{set_trace}{}
Enter the debugger at the calling stack frame.  This is useful to
hard-code a breakpoint at a given point in a program, even if the code
is not otherwise being debugged (e.g. when an assertion fails).
\end{funcdesc}

\begin{funcdesc}{post_mortem}{traceback}
Enter post-mortem debugging of the given \var{traceback} object.
\end{funcdesc}

\begin{funcdesc}{pm}{}
Enter post-mortem debugging of the traceback found in
\code{sys.last_traceback}.
\end{funcdesc}

\subsection{Debugger Commands}

The debugger recognizes the following commands.  Most commands can be
abbreviated to one or two letters; e.g. ``\code{h(elp)}'' means that
either ``\code{h}'' or ``\code{help}'' can be used to enter the help
command (but not ``\code{he}'' or ``\code{hel}'', nor ``\code{H}'' or
``\code{Help} or ``\code{HELP}'').  Arguments to commands must be
separated by whitespace (spaces or tabs).  Optional arguments are
enclosed in square brackets (``\code{[]}'')in the command syntax; the
square brackets must not be typed.  Alternatives in the command syntax
are separated by a vertical bar (``\code{|}'').

Entering a blank line repeats the last command entered.  Exception: if
the last command was a ``\code{list}'' command, the next 11 lines are
listed.

Commands that the debugger doesn't recognize are assumed to be Python
statements and are executed in the context of the program being
debugged.  Python statements can also be prefixed with an exclamation
point (``\code{!}'').  This is a powerful way to inspect the program
being debugged; it is even possible to change variables.  When an
exception occurs in such a statement, the exception name is printed
but the debugger's state is not changed.

\begin{description}

\item[{h(elp) [\var{command}]}]

Without argument, print the list of available commands.
With a \var{command} as argument, print help about that command.
``\code{help pdb}'' displays the full documentation file; if the
environment variable \code{PAGER} is defined, the file is piped
through that command instead.  Since the \var{command} argument must be
an identifier, ``\code{help exec}'' must be entered to get help on the
``\code{!}'' command.

\item[{w(here)}]

Print a stack trace, with the most recent frame at the bottom.
An arrow indicates the current frame, which determines the
context of most commands.

\item[{d(own)}]

Move the current frame one level down in the stack trace
(to an older frame).

\item[{u(p)}]

Move the current frame one level up in the stack trace
(to a newer frame).

\item[{b(reak) [\var{lineno}\code{|}\var{function}]}]

With a \var{lineno} argument, set a break there in the current
file.  With a \var{function} argument, set a break at the entry of
that function.  Without argument, list all breaks.

\item[{cl(ear) [\var{lineno}]}]

With a \var{lineno} argument, clear that break in the current file.
Without argument, clear all breaks (but first ask confirmation).

\item[{s(tep)}]

Execute the current line, stop at the first possible occasion
(either in a function that is called or on the next line in the
current function).

\item[{n(ext)}]

Continue execution until the next line in the current function
is reached or it returns.  (The difference between \code{next} and
\code{step} is that \code{step} stops inside a called function, while
\code{next} executes called functions at (nearly) full speed, only
stopping at the next line in the current function.)

\item[{r(eturn)}]

Continue execution until the current function returns.

\item[{c(ont(inue))}]

Continue execution, only stop when a breakpoint is encountered.

\item[{l(ist) [\var{first} [, \var{last}]]}]

List source code for the current file.  Without arguments, list 11
lines around the current line or continue the previous listing.  With
one argument, list 11 lines around at that line.  With two arguments,
list the given range; if the second argument is less than the first,
it is interpreted as a count.

\item[{a(rgs)}]

Print the argument list of the current function.

\item[{p \var{expression}}]

Evaluate the \var{expression} in the current context and print its
value.  (Note: \code{print} can also be used, but is not a debugger
command --- this executes the Python \code{print} statement.)

\item[{[!] \var{statement}}]

Execute the (one-line) \var{statement} in the context of
the current stack frame.
The exclamation point can be omitted unless the first word
of the statement resembles a debugger command.
To set a global variable, you can prefix the assignment
command with a ``\code{global}'' command on the same line, e.g.:
\begin{verbatim}
(Pdb) global list_options; list_options = ['-l']
(Pdb)
\end{verbatim}

\item[{q(uit)}]

Quit from the debugger.
The program being executed is aborted.

\end{description}
